 `id` bigint(20) unsigned NOT NULL AUTO_INCREMENT,
  `authorizer_appid` varchar(100) DEFAULT NULL COMMENT '公众号APPID',
  `authorizer_access_token` varchar(200) DEFAULT NULL COMMENT '公众号Token',
  `authorizer_refresh_token` varchar(200) DEFAULT NULL COMMENT '公众号刷新Token',
  `func_info` varchar(100) DEFAULT NULL COMMENT '公众号集权',
  `nick_name` varchar(50) DEFAULT NULL COMMENT '公众号昵称',
  `head_img` varchar(200) DEFAULT NULL COMMENT '公众号头像',
  `expires_in` bigint(20) DEFAULT NULL COMMENT 'Token有效时间',
  `service_type` tinyint(2) DEFAULT NULL COMMENT '公众号实际类型',
  `service_type_info` tinyint(2) DEFAULT NULL COMMENT '服务类型信息',
  `verify_type` tinyint(2) DEFAULT NULL COMMENT '公众号实际认证类型',
  `verify_type_info` tinyint(2) DEFAULT NULL COMMENT '公众号认证类型',
  `user_name` varchar(100) DEFAULT NULL COMMENT '众众号原始账号',
  `alias` varchar(100) DEFAULT NULL COMMENT '公众号别名',
  `qrcode_url` varchar(200) DEFAULT NULL COMMENT '公众号二维码地址',
  `business_info` varchar(255) DEFAULT NULL,
  `principal_name` varchar(255) DEFAULT NULL COMMENT '公司名称',
  `idc` tinyint(1) unsigned DEFAULT NULL,
  `status` tinyint(1) unsigned DEFAULT '1' COMMENT '状态(1正常授权,0取消授权)',
  `total` bigint(20) unsigned DEFAULT '0' COMMENT '统计调用次数',
  `appkey` char(32) DEFAULT NULL COMMENT '接口KEY',
  `appuri` varchar(255) DEFAULT NULL COMMENT '响应接口APP',
  `create_by` bigint(20) DEFAULT NULL COMMENT '创建人ID',
  `create_at` timestamp NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  PRIMARY KEY (`id`),
  UNIQUE KEY `index_wechat_config_authorizer_appid` (`authorizer_appid`) USING BTREE
) ENGINE=InnoDB AUTO_INCREMENT=1 DEFAULT CHARSET=utf8 COMMENT='公众号授权参数';